-- +----------------------------------------------------------------------------+
-- |                          Jeffrey M. Hunter                                 |
-- |                      jhunter@idevelopment.info                             |
-- |                         www.idevelopment.info                              |
-- |----------------------------------------------------------------------------|
-- |      Copyright (c) 1998-2012 Jeffrey M. Hunter. All rights reserved.       |
-- |----------------------------------------------------------------------------|
-- | DATABASE : Oracle                                                          |
-- | FILE     : wm_get_workspace.sql                                            |
-- | CLASS    : Workspace Manager                                               |
-- | PURPOSE  : Identify the current workspace.                                 |
-- | NOTE     : As with any code, ensure to test this script in a development   |
-- |            environment before attempting to run it in production.          |
-- +----------------------------------------------------------------------------+

SET TERMOUT OFF;
COLUMN current_instance NEW_VALUE current_instance NOPRINT;
SELECT rpad(sys_context('USERENV', 'INSTANCE_NAME'), 17) current_instance
FROM dual;
SET TERMOUT ON;

PROMPT 
PROMPT +------------------------------------------------------------------------+
PROMPT | Report   : Get Current Workspace                                       |
PROMPT | Instance : &current_instance                                           |
PROMPT +------------------------------------------------------------------------+

SET ECHO        OFF
SET FEEDBACK    6
SET HEADING     ON
SET LINESIZE    180
SET PAGESIZE    50000
SET TERMOUT     ON
SET TIMING      OFF
SET TRIMOUT     ON
SET TRIMSPOOL   ON
SET VERIFY      OFF

CLEAR COLUMNS
CLEAR BREAKS
CLEAR COMPUTES

COLUMN getworkspace     FORMAT a50          HEADING "Current Workspace"

SELECT dbms_wm.getworkspace
FROM   dual;
