STARTUP NOMOUNT

CREATE CONTROLFILE set DATABASE "test8" RESETLOGS  NOARCHIVELOG
--  SET STANDBY TO MAXIMIZE PERFORMANCE
    MAXLOGFILES 50
    MAXLOGMEMBERS 5
    MAXDATAFILES 100
    MAXINSTANCES 1
    MAXLOGHISTORY 226
LOGFILE
  GROUP 1 '/bms/u04/oradata/test8/redo01.log'  SIZE 20M,
  GROUP 2 '/bms/u04/oradata/test8/redo02.log'  SIZE 20M,
  GROUP 3 '/bms/u04/oradata/test8/redo03.log'  SIZE 20M
-- STANDBY LOGFILE
DATAFILE
  '/bms/u04/oradata/test8/system01.dbf',
  '/bms/u04/oradata/test8/undotbs01.dbf',
  '/bms/u04/oradata/test8/usr01.dbf',
  '/bms/u04/oradata/test8/indx01.dbf'
CHARACTER SET WE8ISO8859P15
;

ALTER DATABASE OPEN RESETLOGS;

ALTER TABLESPACE TEMPORARY ADD TEMPFILE '/bms/u04/oradata/test8/temporary01.dbf'
 REUSE AUTOEXTEND ON NEXT 655360  MAXSIZE 32767M;

alter database rename global_name to test8.world;

alter user cramer identified by cramer;
alter user sys identified by syspass;
alter user system identified by syspass;

