CREATE DATABASE "9207" 
USER sys IDENTIFIED BY syspass 
USER system IDENTIFIED BY syspass 
--CONTROLFILE REUSE
MAXLOGFILES 50 
MAXLOGMEMBERS 5 
MAXLOGHISTORY 9999
MAXINSTANCES 1 
MAXDATAFILES 100 
NOARCHIVELOG 
--FORCE LOGGING
CHARACTER SET WE8ISO8859P1
NATIONAL CHARACTER SET AL16UTF16   
EXTENT MANAGEMENT LOCAL
LOGFILE 
  GROUP 1 '/opt/oracle/oradata/9207/redo01.log' SIZE 30M,
  GROUP 2 '/opt/oracle/oradata/9207/redo02.log' SIZE 30M,
  GROUP 3 '/opt/oracle/oradata/9207/redo03.log' SIZE 30M,
  GROUP 4 '/opt/oracle/oradata/9207/redo04.log' SIZE 30M,
  GROUP 5 '/opt/oracle/oradata/9207/redo05.log' SIZE 30M
DATAFILE
  '/opt/oracle/oradata/9207/system01.dbf' SIZE 50M AUTOEXTEND ON NEXT 50m MAXSIZE 4001M
UNDO TABLESPACE UNDOTBS
  datafile '/opt/oracle/oradata/9207/undo_tbs01.dbf' SIZE 10m AUTOEXTEND ON NEXT 50m MAXSIZE 4001M
DEFAULT TEMPORARY TABLESPACE temp
    TEMPFILE '/opt/oracle/oradata/9207/temp01.dbf' SIZE 50M AUTOEXTEND ON NEXT 50m MAXSIZE 4001M
/

spool catalog.log
@?/rdbms/admin/catalog.sql
spool off

spool catproc.log
@?/rdbms/admin/catproc.sql
spool off


--@/u01/app/oracle/bin/full_jvminst.sql


