
/*
*
*  Author  : Vishal Gupta
*  Purpose : This script is called at end of every other script
*
*  Revision History:
*  ===================
*  Date       Author        Description
*  ---------  ------------  -----------------------------------------
*  05-Aug-04  Vishal Gupta  Created
*
*/


-- VG_SPOOLFILE is being set in the login.sql
-- spool again to flush the buffer contents to file
--spool &&VG_SPOOLFILE append 

CLEAR COLUMNS
CLEAR BREAKS
CLEAR COMPUTES

set trimspool on
set feed on
set arraysize 5000
set lines 80
set pages 80
set verify on
set sqlblankline on
set serveroutput on
set tab off
set term on
--start backupenv

DEFINE 1=""
DEFINE 2=""
DEFINE 3=""
DEFINE 4=""
DEFINE 5=""
DEFINE 6=""
DEFINE 7=""
DEFINE 8=""
DEFINE 9=""
DEFINE 10=""

-- VG_SPOOLFILE is being set in the login.sql
-- spool again to flush the buffer contents to file
-- spool &&VG_SPOOLFILE append 

--set echo on
PROMPT